S3Cfg3D Plus


顯示本公用程式的版本。


按一下這裡開啟本產品的網頁。


顯示原來設備製造商或產品商標。


包括讓您選擇要修改哪些應用程式設定的控制，以及把那些設定複製到其他應用程式或從其他應用程式複製過來。


從已存設定的清單中移除所選的應用程式。


顯示一個下拉功能表，允許您選擇不管是從其他應用程式複製設定，或把應用程式的設定複製到另一個。


把所有組態設定重置回其預設值。


顯示一下拉功能表，允許您選擇想調整的設定群組。基本設定會一直顯示。核取「媒體」功能表項目來顯示「媒體」等級的設定，而反核取來隱藏設定。核取「進階」功能表項目來顯示「進階」等級的設定，而反核取來隱藏設定。


列出所有「顯示」功能表允許的可調整設定。按一下設定來選取，之後在清單下方會出現下拉清單或滾動軸來允許改變設定值。


等待螢幕同步，或等待 Vsync，會把緩衝區調換跟顯示器的「垂直同步」或「垂直回溯信號」作同步，並清除週期。

預設設定 By App 會等待或不等待應用程式要求的同步。

ON 迫使螢幕同步等待，以致當垂直回溯時後緩衝區會跳動。與垂直回溯作同步會限制畫面比例以致無法超出刷新速率。ON 會降低�撕裂�假象的機會。

OFF 允許緩衝區調換在不等待垂直同步時進行處理。當緩衝區跳動發生在不同時間而不是在垂直清除週期內時，�撕裂�或�修剪�視覺假象會很明顯。而畫面比例可能增加。


快速三線段過濾是傳統三線段過濾的最佳化，其帶有四個最靠近來源結構的圖素(或最合適的mip-map)並插入這些值來提供雙線段過濾結構元件。之後插入兩個來自兩個mip-map的雙線段過濾結構元件來產生三線段過濾結構元件。傳統三線段過濾從結構記憶體讀取八個結構元件時，使用高達雙線段過濾的兩倍頻寬。快速三線段過濾是高度最佳化來有效使用等於雙線段過濾需求的頻寬。

預設 Auto 讓軟體決定哪個三線段過濾方法最好。

ON 迫使「快速三線段過濾」一直啟動。視覺品質無顯著降低是最佳效能的表現。


快速目的清除速度以作為提供快速有效率清除目的緩衝區的硬體為目標。

預設 Auto 讓軟體決定何時使用輔助快速清除的硬體。

ON 迫使「快速目的清除」具備最佳效能及快速執行，而且是較佳的設定。若一應用程式已顯示快速清除的議題，之後這應用程式會停用它。

OFF 停用「快速目的清除」。要求會使用傳統方法來清除整個目的緩衝區。這會造成一個較慢的清除循環，但可解決無法預期的視覺品質議題。


快速 Z 清除為了取得更有效率的執行，使用輔助快速方法的硬體來清除 Z 及模板緩衝區。

預設 Auto 讓軟體決定何時使用 Z 及模板緩衝區輔助快速清除的硬體。

 ON 透過硬體迫使所有要求來清除處理中的 Z 及模板緩衝區。這通常會加快執行，是較佳的設定。

OFF 停用硬體快速 Z 清除。Z 及模板緩衝區之清除使用較慢、傳統的方法。在一些應用程式上，這可解決無法預期的視覺品質議題。


詳細等級調整。從「品質」到「效能」調整 mipmap 的詳細等級(LOD)偏差。高品質影像比較敏感及易混淆，而原因是使用較高的 MIP 地圖等級數字。較模糊影像起因於使用中間MIP地圖等級的較小數字。

預設 Auto 讓軟體最佳化偏差調整的詳細等級。

0 (品質) 使用可能最大偏差的詳細等級和最高的 MIP 地圖等級數字，來給予最高可得的視覺品質及細節。許多結構資料處理時在執行速度上有很大的衝擊。

在品質及效能之間，選擇任意的中間等級來達到最佳平衡。

8 (效能) 藉由使用可得的最小 MIP 地圖等級數字來提供較少細節。要有較高速度性能需犧牲視覺品質。


最大深度緩衝區尺寸設定「深度緩衝區」(Z緩衝區)可得的最大精確性。當使用較高位元緩衝區時，視覺品質隨可得的較高精確性而增加。這使執行速度相對會少許降低。

預設 By App 告訴軟體提供應用程式所需的深度緩衝區尺寸。

16 迫使 16 位元，低精確性深度緩衝區。應用程式可要求 16 位元深度緩衝區，因為這深度會提供較快執行速度。降低精確性到 16 位元深度緩衝區會產生視覺假象。低精確性會降低視覺品質，並在遠端物體建立表面假象。

24 迫使 24 位元深度緩衝區。

32 迫使 32 位元高精確性深度緩衝區。視覺品質高，但執行速度較低。


每圖素伽瑪可應用到每一結構元件。每一圖素伽瑪校正在結構樣本中執行，之後呈現在最後執行的圖素遮蔽物之前，結構元件的伽瑪值轉換到線性伽瑪。好的調協伽瑪造成較好的視覺品質輸出。

預設 By App 只在應用程式要求上應用伽瑪校正。

?了得到較佳的視覺品質，ON 一直啟用伽瑪校正。這可能有少許的效能衝擊。

OFF 停用伽瑪校正。即使應用程式要求校正，也不應用任何校正。


抗混淆 在多邊形及直線可降低鋸齒狀邊緣及樓梯效應。對兩邊緣的每一側取樣，之後作為鄰接色彩的混和來使邊緣外表平順。硬體藉由超級取樣來支援抗混淆。取樣結果可縮減到原來尺寸，產生高品質的次取樣。

預設 By App 讓應用程式指定應用的超級取樣的等級。

2X 啟用最佳化 2X 抗混淆，在效能速度上只有最小的衝擊。

OFF 停用抗混淆。影像品質經常受損，但因較少的圖素處理存在所以可增加效能。


各向異性(表示不同外形)過濾對結構影像的四邊形及傾斜或有角度區域是有用的。當三線段過濾能夠產生好的視覺時，只從方塊區域取樣。各向異性過濾會在非方形、矩形或平行四邊形圖案中平均結構樣本、或輕點，圖案的長度隨伸展效應的方向成比例地改變。

預設 By App 讓軟體使用應用程式要求的各向異性等級。

2X 在其最低等級上啟用各向異性過濾。從非方形圖案中所選的 16 結構取樣(輕點)，會平均產生一個之後應用在單一圖素的結構元件(texel)。

3X, 4X, �, 15X 是中間取樣等級。在品質及效能之間挑選您偏愛的平衡。取樣等級越高，過濾程度越大。改善視覺品質會犧牲效能。

16X 迫使在非方形取樣圖案中使用 128 輕點的各向異性取樣。非常高品質視覺輸出經常伴隨著執行速度的降低。

OFF 停用向異性過濾。


版權公告

�2004年S3 Graphics有限公司版權所有。保留所有權利。在此包含之資訊是S3 Graphics獨有之財產，在未經S3 Graphics先前書面許可前不得整體或部分散佈、重新製造或公開。若您已收到從S3 Graphics寄來的電子檔型式文件，即允許您對S3 Graphics產品作以下商業用拷貝：一用來在電腦上線上檢視的副本，以及一印刷副本。關於所有文件，不管是以硬拷貝或電子檔型式接收，其他用途，拷貝或儲存，整體或部分，藉任何方式，電子、機械、影印或其他方法，在未經S3 Graphics有限公司，1045 Mission Court, Fremont, CA 94539, USA，先前書面同意前是不被允許的。S3 是S3 組織的註冊商標。AlphaChrome、DeltaChrome、DuoView、ProSavage、Savage、Savage4、SavageXP、Streams Processor、SuperSavage、Twister 以及 UniChrome 是 S3 Graphics 的商標。本文件其他相關商標是由其各自的公司擁有。本文件中的物件只當作資訊參考，並且在未公告下可接受改變。S3 Graphics保留權利在不對其使用者保留及公告下可對產品設計作改變。